Mon Jan 9 15:01:05 1995

0.001 0.01 0.1 1 10 100 1000 1

10

100 Tela benchmark B=A+1

Vector length (kWord)

Mflops

IRIX 5.2 on nuotta

MFLOPS as function of vector length

1

SGI R4400

IBM Power-2

SGI R8000

This machine